0 5 10 15 20

1

2

3

4 prompt AA R/ non-prompt AA R

data LGR TAMU MC@sHQ+EPOS2 CUJET3.1

ALICE = 5.02 TeV NNs Pb, −Pb | < 0.5 y 10%, | −0

0 5 10 15 20 )c (GeV/ Tp

1

2

3

4 prompt AA R/ non-prompt AA R

data LGR central value (E-loss) c set to m b i) m (coalescence) c set to m b ii) m iii) w/o shadowing iv) w/o coalescence

ALI-PUB-534213

ALI-PUB-534213